From 32e304f01e33fe93d117d3ae9aa82e37f9138582 Mon Sep 17 00:00:00 2001
From: Chloe Kudryavtsev <toast@toastin.space>
Date: Wed, 27 Feb 2019 21:51:36 -0500
Subject: [Install] Grub is mostly fine now

---
 modules/Installing/pages/manual.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'modules/Installing/pages/manual.adoc')

diff --git a/modules/Installing/pages/manual.adoc b/modules/Installing/pages/manual.adoc
index 68f8bad..dcaca67 100644
--- a/modules/Installing/pages/manual.adoc
+++ b/modules/Installing/pages/manual.adoc
@@ -488,7 +488,7 @@ In our example, this is `setup-disk /mnt`.
 // TODO: maybe mention `/etc/default/grub`?
 [CAUTION]
 ====
-Bootloader setup, and grub in particular, tends to have issues.
+Bootloader setup in general tends to have issues.
 If after rebooting (the next step) you run into issues, feel free to ask for help in any of the support channels mentioned in the xref:ROOT:index.adoc#_where_to_get_help[introduction].
 ====
 
-- 
cgit v1.2.3

