From d7aa15affcad8db23bb6be7a4430ac6a4592853d Mon Sep 17 00:00:00 2001
From: Peter Macko <pmacko@redhat.com>
Date: Fri, 8 Jun 2018 14:17:40 +0200
Subject: update README.adoc with correct ui bundle snippet

---
 README.adoc | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 786cc1e..ee2fe0b 100644
--- a/README.adoc
+++ b/README.adoc
@@ -30,7 +30,9 @@ If you want to use the default UI for your Antora-generated site, add the follow
 [source,yaml,subs=attributes+]
 ----
 ui:
-  bundle: https://gitlab.com/antora/antora-ui-default/-/jobs/artifacts/master/raw/build/ui-bundle.zip?job=bundle-stable
+  bundle:
+    url: https://gitlab.com/antora/antora-ui-default/-/jobs/artifacts/master/raw/build/ui-bundle.zip?job=bundle-stable
+    snapshot: true
 ----
 
 Read on to learn how to use your own build of the default UI.
-- 
cgit v1.2.3

